\documentclass[margin,line]{resume}
 
\usepackage[latin1]{inputenc}
\usepackage[english,french]{babel}
\usepackage[T1]{fontenc}
\usepackage{fontawesome}
\usepackage{graphicx,wrapfig}
\usepackage{url}
\usepackage[colorlinks=true, pdfstartview=FitV, linkcolor=blue, citecolor=blue, urlcolor=blue]{hyperref}
\pdfcompresslevel=9


\begin{document}{\sc \Large Curriculum Vitae -- Tibault Reveyrand}
\begin{resume}

% === PICTURE ===

    \vspace{0.5cm}
    \begin{wrapfigure}{R}{0.15\textwidth}
         \vspace{-0.9cm}
        \begin{center}
        \includegraphics[width=0.15\textwidth]{reveyrand_face.png}
        \end{center}
         \vspace{-1cm}
    \end{wrapfigure}

% === PERSONAL INFO ===
 
    \section{\mysidestyle Personal\\Information}
    Tibault Reveyrand \\
    Limoges, France\\ 
    \faTv  \space \href{http://www.microwave.fr}{www.microwave.fr} \\ 
    \faTwitter  \space \href{https://twitter.com/reveyrand/}{@reveyrand} \\
    \faLinkedin \space \href{http://www.linkedin.com/in/reveyrand/}{www.linkedin.com/in/reveyrand} \\ 
    \faYoutubePlay  \space \href{https://www.youtube.com/c/tibaultreveyrand/}{www.youtube.com/c/tibaultreveyrand}
   
% === OBJECTIVE ===

    \section{\mysidestyle Professional Objective}
    Improve the efficiency of the microwave and RF designers and structures. I focus on nonlinear devices at circuits level (such as HEMTs transistors) and at system level (HPA, Switches). That purpose requires an original use of an advanced RF instrumentation associated to a strong knowledge in terms of measured devices modeling.
 
% === SKILLS ===
       
    \section{\mysidestyle Skills}\vspace{2mm}       
    \begin{description}
   			\item[Operating systems:] DOS, Windows, Unix and Linux.
				\item[Programming languages:] Pascal, 80x86 Assembler, C, C++, TCL/TK, JAVA, HTML, Javascript, PHP, mySQL.
				\item[Office softwares:]  \LaTeX, Microsoft Office, Open Office.
				\item[Scientific softwares] Maple, Matlab, Mathematica, Scilab, Keysight's VEE and ADS, NI LabVIEW.
				\item[Characterization tools:] Spectrum analyzers, scopes, AWG, VNA, LSNA, probe stations, high impedance probes. I have developed calibration procedures and automated calibration and measurements processes.
				\item[System Level Modeling:] Amplifiers, modulators and mixers with splines, neural networks or Volterra expansions. Bilateral Modeling by PhD model.
				\item[Circuit Level Modeling:] Linear, nonlinear and electrothermal models of HEMTs.
				\item[Languages:] French, English.
    \end{description}
     
% === CERTIFICATIONS ===
    
      \section{\mysidestyle Certifications}
      \textbf{National Instruments} Certified LabVIEW Associate Developer (CLAD) \hfill \textsl{July 2014-July 2016}\\

% === AWARDS ===

      \section{\mysidestyle Awards}\vspace{4mm}  
      \begin{list2}
        \item \textbf{Best Paper Award}, European Microwave Week - Galium Arsenide Application Symposium (GAAS), 2002 \\
        \textsl{\footnotesize{T. Reveyrand, C. Maziere, J.M. N\'ebus, R. Qu\'er\'e, A. Mallet, L. Lapierre, J. Sombrin, ``A calibrated time domain envelope measurement system for the behavioral modeling of power amplifiers'', European Microwave Week, GAAS 2002, pp. 237-240, Milano, September 2002}}
        \vspace{1mm}
        \item \textbf{Best Student Paper Award}, Journ\'ees Nationales Micro-ondes (JNM), 2007 \\
\textsl{\footnotesize{
O. Jardel, F. De Groote, T. Reveyrand, C. Charbonniaud, J.P. Teyssier, R. Qu\'er\'e, D. Floriot, ``Mod\'elisation du drain-lag dans les mod\`eles \'electriques grand-signaux de transistors HEMTs AlGaN/GaN'', 15eme Journ\'ees Nationales Micro-ondes (JNM),3C1, Toulouse, Mai 2007.}}
      \end{list2}
    	
    	Up to 140 other refrences are available here : \\ 
    	\vspace{-8mm}

\href{http://www.microwave.fr/publications.html}{http://www.microwave.fr/publications.html}
 	%\vspace{-1mm}
 	
% === ORGANIZATIONS ===

 	    \section{\mysidestyle Professional Organizations}%\vspace{2mm}       
 	      \textbf{The Institute of Electrical and Electronics Engineers (IEEE)}\\
 	      Member of:
 	      \begin{list2}
	      \item{IEEE MTT-S Technical Program Review Committee (TPRC) for IMS  \hfill \textsl{2013-present}}
          \item{MTT-11 ``Microwave Measurements'' technical committee \hfill \textsl{2009-present}}
          \subitem{$\Rightarrow$ Vice-Chair \hfill \textsl{2017-present}}
          \item{``Microwave Theory and Techniques'' society  \hfill \textsl{2007-present}}
		  \item{``Instrumentation and Measurement'' society  \hfill \textsl{2007-2016}}
 	      \item{Judge for IEEE MTT-S Graduate Fellowships  \hfill \textsl{2014-2015}}
 	      \item{Chair for IEEE Denver Section Jt. Chapter, AP03/MTT17  \hfill \textsl{2015-2016}}
 	      
 	      \end{list2}
 	   \textbf{The European Microwave Association (EuMA)}\hfill \textsl{2009-2015}
 	   
 	   
 	   
 	   
 	   
 	   
 	   
 	   
 	   	\vfill
 	   
 	
    
% === HISTORY ===

 	    \section{\mysidestyle Employment History}\vspace{2mm}   	   
 	   
 	          
       \begin{description}
       
        
       		\item[Measurement Engineer (CNRS)]\small{XLIM \hfill \textsl{June 2016-present}}\\ 	
            \vspace{-2mm}
            
            \item[Lecturer]\small{University of Limoges \hfill \textsl{February 2017-March 2017}}\\
    				iXEO - Master2, ``Microwave Measurements''
			\vspace{2mm}
            
           
  	      	
            
   		    \item[Research Associate]\small{University of Colorado at Boulder \hfill \textsl{June 2013-May 2016}}\\
       		Achievements:
  	      		\begin{list2}
  	      		 	   	\item{LabVIEW software for a ``Do-it-yourself'' Large-Signal Network Analyzer (LSNA)}
 	      				%\item{Time domain measurement setup in Scilab (VTD-SWAP)}
 	      				\item{Outphasing PA characterizations}
 	      				%\item{Load-pull in time-domain}
 	      			\end{list2}   	
 	      	\vspace{2mm}
 
           \item[Lecturer]\small{University of Colorado, Boulder \hfill \textsl{January 2016-May 2016}}\\
    				ECEN 5014-003, ``Microwave Measurements and Calibration Fundamentals''
  			\vspace{2mm}
   
    		\item[Measurement Engineer (CNRS)]\small{XLIM \hfill \textsl{December 2007-May 2013}}\\
    		Achievements:
  	      		\begin{list2}
 	      				\item{GaN HEMTs circuits level modeling from european foundries (Thales / QinetiQ) for HPA, LNA and Switches}
 	      				\item{Time domain measurement setup (LSNA) development on Scilab-TCL/TK (GUI, calibration and measurement automation)}
 	      				\item{Development of HEMTs modeling tools (Scilab)}
 	      				\item{Contractual measurements such as load-pull, linearity, high impedance probe in both frequency (VNA) and time domain (LSNA)}
 	      			\end{list2}   
 			\vspace{2mm}
 			
 				
 			\item[Research Associate - Visiting Scholar]\small{University of Colorado at Boulder \hfill \textsl{February 2012-July 2012}}\\
 				    GaN HEMTs based rectifiers characterizations and analysis
 			\vspace{2mm}
 				
     		\item[Research Engineer (CNRS)]\small{XLIM \hfill \textsl{May 2005-November 2007}}\\
   			Achievements:
  	        \begin{list2}
 	      		\item{Frequency domain load-pull measurement setup (VNA in receiver mode with pulse capabilities) development with Scilab (calibration procedures, measurement automation, data processing)}
 	      		\item{Large signal characterization of transistor (mainly European GaN in the framework of Korrigan}
 	      		\item{European Project workpackage leader (Korrigan WP3.3). Development of an internet database (Php / mySQL) to let partners share data and informations}
 	      		\item{GaN HEMTs ``spice-like'' nonlinear models}
 	      	\end{list2}  	      
 			\vspace{2mm}
     		
            
            \item[Research Engineer]\small{NMDG Engineering bvba \hfill \textsl{November 2004-February 2005}}\\
    			High Impedance Probe module (calibration and measurements) in the commercial LSNA Software (based on Mathematica)
 
			\vspace{2mm}
     		
            
            \item[Postdoctoral scientist]\small{CNES (French Space Agency) \hfill \textsl{October 2003-September 2004}}\\
    			Development of characterization tools interfaces within the free open-source scientific package Scilab
 
   			\vspace{2mm}
     		
            
            \item[Postdoctoral scientist]\small{CNES (French Space Agency) \hfill \textsl{October 2002-September 2003}}\\ 	     	
 					Achievements:
  	      	\begin{list2}
 	      		\item{Large Signal Network Analysis (LSNA) characterizations in time-domain}
 	      		\item{Development of a new LSNA module in order to investigate time domain waveforms at internal nodes of MMICs with high impedance probes (HIP) to validate circuits designs and to analyze nonlinear parametric stability}
 	      		\item{Large Signal Network Analysis (LSNA) characterizations in time-domain}
 	      	\end{list2}  	      
 			\vspace{2mm}
     		
            
            \item[Researcher]\small{IRCOM / University of Limoges \hfill \textsl{October 1998-September 2002}}\\ 	     	
 					Achievements:
  	      	\begin{list2}
 	      		\item{Development of the RF time-domain envelope measurement setup (hardware and software)}
 	      		\item{Development of the calibration procedure of the time-domain envelope measurement setup}
 	      		\item{Power amplifiers characterizations : Load-pull, IM3, NPR}
 	      		\item{Behavioral modeling of nonlinear devices with memory effects for system level}
 	      		\item{Development of a dynamic complex gain model with neural networks}
 	      	\end{list2}  	      
  			\vspace{2mm}
     		
            
            \item[Lecturer]\small{University of Limoges \hfill \textsl{October 1998-September 2002}}\\
    				RF devices, analog/digital communication systems, signal processing, propagation waves...
			\vspace{2mm}
     		
            
            \item[Postgraduate student]\small{IRCOM / University of Limoges \hfill \textsl{February 1998-July 1998}}\\
    				Circuits level simulations of IM3 and NPR in order to optimize the trade-off between linearity and efficiency
    				
    \end{description}
    
    
       
 	  \section{\mysidestyle Education} 
 	   Ph.D in High Frequency Devices and Circuits - Electronic and Optoelectronic, April 2002 \\
      University of Limoges (France)	   
 	       
\end{resume}   
\end{document}